log2(kB) file size

0 2 4 6 8

10 12

14 16 18 20 log2(kB) record size

0 1 23 4 5 6 78 9 0 2 4 6 8 10

Write (MB/sec) log2(kB) file size

0 2 4 6 8

10 12

14 16 18 20 log2(kB) record size

0 1 23 45 6 78 9 0 200 400 600 800 1000

1200

Read (MB/sec) log2(kB) file size

0 2 4 6 8

10 12

14 16

18 20 log2(kB) record size

0 1 23 4 5 6 78 9 0 2 4 6 8 10 12 14

Random Write (MB/sec) log2(kB) file size

0 2 4 6 8

10 12

14 16

18 20 log2(kB) record size

0 1 23 45 6 78 9 0 200 400 600 800 1000

1200

1400

Random Read (MB/sec) log2(kB) file size

0 2 4 6 8 10

12 14 16

18 20 log2(kB) record size

0 1 23 4 5 6 78 9 0 2 4 6 8 10

FWrite (MB/sec) log2(kB) file size

0 2 4 6 8 10

12 14 16

18 20 log2(kB) record size

0 1 23 45 6 78 9 0 2 4 6 8 10

FRead (MB/sec)