(X% / 40-80%) CPR

0.2 0.4 0.6 0.8 1.0 1.2 1.4_{20-40% 62.4 GeV}

0-10% 62.4 GeV 0-12% 200 GeV

-π+^+π pp+

(GeV/c) Tp 1 2 3 4 5 6 7 8 9

AA R

0.2 0.4 0.6 0.8 1.0 1.2 62.4 GeV

-π+^+π

I. Vitev

/dy : 650 - 800) g (dN X.-N. Wang = 4, 10 fm/c) τ(

(GeV/c) Tp 1 2 3 4 5 6 7 8 9 10

J. Alam et al.- Collisional = 10 fm/c) τ X.-N. Wang ( I. Vitev

/dy : 800 - 1175) g (dN 200 GeV

-π+^+π