n̂_{ch}

<p_t> (GeV/c)

UA1 900 GeV power-law UA1 200 GeV power-law STAR 200 GeV power-law two-component model direct integration

0.36

0.38 0.4 0.42

0.44

0.46

0.48 0.5 0.52

0.54

0 2 4 6 8 10 12