n̂_{ch}

10 n_h / n_s

end-point amplitude gaussian amplitude

fixed model n = 12.8 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

0 2.5 5 7.5 10 12.5