0 2 4 6 8 10 12

CPR

0.2 0.4 0.6 0.8 1 1.2 1.4 (a)0-12%/40-80%

-π+^+π pp+ Vitev

0 2 4 6 8 10 12

(b)20-40%/40-80%

0 2 4 6 8 10 12

(c)0-12%/60-80%

(GeV/c) T Transverse Momentum p