200 400 600 800

5- 10 4-10

3- 10 2-10

1-10

(a) 7.7 GeV

200 400 600 800

5- 10 4-10

3- 10 2-10

1-10

(b) 11.5 GeV

200 400 600 800

(c) 14.5 GeV

200 400 600 800

(d) 19.6 GeV

200 400 600 800

(e) 27 GeV

200 400 600 800 5- 10 4-10

3- 10 2-10

1-10

(f) 39 GeV

200 400 600 800 5- 10 4-10

3- 10 2-10

1-10

(g) 54.4 GeV

200 400 600 800

(h) 62.4 GeV

200 400 600 800

(i) 200 GeV

200 400 600 800

Au+Au Col�isions

0-5% Data Glauber simulation

Reference Charged Particle Multiplicity

Normalized Number of Events