0 100 200 300

7

8 dca < 0.8 dca < 0.9 dca < 1.0 dca < 1.1 dca < 1.2

0 100 200 300

0.1

0.15

0 100 200 300 0.6 0.8 1 1.2

0 100 200 300

7

8 nFitPts > 15 nFitPts > 18 nFitPts > 20 nFitPts > 22 nFitPts > 25

0 100 200 300

0.1

0.15

0 100 200 300 0.6 0.8 1 1.2

0 100 200 300

7

8

| < 1.6 pσ|n | < 1.8 pσ|n | < 2.0 pσ|n | < 2.2 pσ|n | < 2.5 pσ|n

0 100 200 300

0.1

0.15

0 100 200 300 0.6 0.8 1 1.2

0 100 200 300

7

8

)^4/c^2

< 1.10(GeV 2 0.50 < m )^4/c^2

< 1.15(GeV 2 0.55 < m )^4/c^2

< 1.20(GeV 2 0.60 < m )^4/c^2

< 1.25(GeV 2 0.65 < m )^4/c^2

< 1.30(GeV 2 0.70 < m

0 100 200 300

0.1

0.15

Au+Au 200 GeV Net-Proton

0 100 200 300 0.6 0.8 1 1.2

0 100 200 300

7

8 +5% -5% default

0 100 200 300 0.1

0.15

|y| < 0.5 < 2.0 (GeV/c) T 0.4 < p

0 100 200 300 0.6 0.8 1 1.2

2 / C 4C_2 / C_3C_1 / C_2C

〉 _{part} N〈 Average Number of Participant Nucleons