0 20 40 60 80

Centrality [%]

0

2

4

[%] HP

STAR = 200 GeV NNs Au+Au

>0.5 Ξ T |<1, p Ξ|y

(PRC98.014910) Λ Inclusive )_H PΛ

(via daughter + Ξ+^-Ξ syst. uncert.

0.014 ± = 0.732 Λα 0.012 ± = -0.758 Λα = 0.944 ΛΞC