0 20 40 60 80 100 120 140 (GeV)

-e^+em 0 20 40 60 80 100 120 140

Events / 4 GeV

STAR (2011+2012+2013)

(MC)

-e^+ e

→^*γZ/

|< 1.0 eη|

(a)

1− 0.5− 0 0.5 1 Zy 0 20 40 60 80 100 120 140 160 180 200

Events

= 500/510 GeV s STAR p+p < 110 GeV

-e^+e

70 GeV < M (b)