1− 0.5− 0 0.5 1 eη 0 2 4 6 8 10 12

W- fidσ/_{W+}^{fid}σ

)^{-1}

2011 (25 pb )^{-1}

2012 (75 pb )^{-1}

2013 (250 pb

= 510 GeV s STAR p+p ν e → W < 50 GeV T e 25 GeV < E