-1.5 -1 -0.5 0 0.5 1 1.5 0.6 0.7 0.8 0.9 1 1.1 1.2

| > 0.5

lead

η - η | < 1 and | η EP by particles | /ndf = 92/88

2χ, _{EP}ψ

Fit curve: 1 - 0.0044 cos2 /ndf = 106/89 2χ Constant fit | < 1 η EP by particles |

[rad] EPψ

EPψd evt dN evt Nπ 1