beam yΔ y / Δ 0 0.05 0.1 0.15 0.2

(NBD) 2C )Λ -

Λ (_2C

0.95

0.96

0.97

0.98

0.99 1 1.01

1.02

〉 _i^{π4} N〈

〉 _Λ^{acc} N〈 = _iα

Au + Au, 0-5% central collisions (GeV/c) < 2.0 T 0.9 < p

19.6 GeV, data 200 GeV, data )_Bα + _Sα

19 GeV, 1 - ( )_Bα + _Sα

200 GeV, 1 - (