)^2

(GeV/c eem 2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 3.6

)^2 Counts/(20MeV/c

5 10 15 20 25 30 35 40 45 50 (a) Au+Au 200GeV

STAR

< 0.1 GeV/c Tp 13 ± Signal: 149 Background: 16 unlike-sign like-sign mixed-event

2.6 2.7 2.8 2.9 3 3.1 3.2 3.3 3.4 3.5 3.6

5 10 15 20 25 30 (b) U+U 193GeV

9± Signal: 51 Background: 6