eη 1− 0 1 1−

0.5 −

0

0.5 - W

+W

X + ^± e →X + ^± W →p + p_{= 510 GeV}

s 50 GeV

<^e_T < E 25 LA

Rel lumi syst

3.3% beam pol scale uncertainty not shown

STAR 2011-2013 BS15 CHE NLO DSSV14 CHE NLO DSSV14 RHICBOS NNPDFpol1.1 CHE NLO NNPDFpol1.1rw CHE NLO