1.08 1.09 1.1 1.11 1.12 1.13 1.14 1.15 1.16

]^2 mass [GeV/c 0

100

200

300 310 ×

)^2 counts / (MeV/c

< 8 [GeV/c] Tp 1 <

)^-π (p Λ )^+πp (Λ