0 100 200 300 0.6 0.8 1.0 1.2

(a) 7.7 GeV

0 100 200 300 0.6 0.8 1.0 1.2

(e) 39 GeV

0 100 200 300 0.6 0.8 1.0 1.2

(b) 11.5 GeV

0 100 200 300 0.6 0.8 1.0 1.2

(f) 62.4 GeV

0 100 200 300 0.6 0.8 1.0 1.2

(c) 19.6 GeV

0 100 200 300 0.6 0.8 1.0 1.2

(g) 200 GeV

0 100 200 300 0.6 0.8 1.0 1.2

(d) 27 GeV

0 100 200 300 0.6 0.8 1.0 1.2 Au+Au Collisions Net-proton

<0.8 (GeV/c),|y|<0.5 T 0.4<p 2σκ Skellam σS Ind. Prod.

> part

Average Number of Participant Nucleons <N