)^2

(ee) (GeV/c invM

2.6 2.8 3 3.2 3.4 3.6 3.8 4

)^2 Counts / (20 MeV/c

100 200 300 400 500 600 700 800

(mixed-event) background unlike-sign pairs <5 GeV/c T 3<p <10 GeV/c T 5<p (a)

)^2

(ee) (GeV/c invM

2.6 2.8 3 3.2 3.4 3.6 3.8 4

)^2 Counts / (40 MeV/c

-50 0 50 100 150 200 250 300 350 400 <5 GeV/c T 3<p <10 GeV/c T 5<p (b) background subtracted

)^2

(ee) (GeV/c invM

2.6 2.8 3 3.2 3.4 3.6 3.8 4

)^2 Counts / (20 MeV/c

0 10 20 30 40 50 60 70 80 unlike-sign like-sign

(c) < 4 GeV/c T 2 < p

)^2

(ee) (GeV/c invM

2.6 2.8 3 3.2 3.4 3.6 3.8 4

)^2

Counts / (40 MeV/c

0 5 10 15 20 25 30 (d) < 12 GeV/c T 8 < p

= 200 GeV NNs Au+Au 0-60%

= 200 GeV s p+p