0.2 0.3 0.4 0.5 0.6

0.8

1

1.2

0.6

0.8

1

1.2

[fm] oR

]^2c

[GeV/ Tm 0.2 0.3 0.4 0.5 0.6 0.8

1

1.2

0.6 0.8

1

1.2

[fm] sR standard fit fit -qδ fit β -ζ EMCIC fit

]^2c

[GeV/ Tm 0.2 0.3 0.4 0.5

1

1.5

2

1

1.5

2

[fm] lR