0.2 0.3 0.4 0.5 0.6 0.5

1

0.5

1

[fm] oR

]^2c

[GeV/ Tm 0.2 0.3 0.4 0.5 0.6

0.5

1

0.5

1

[fm] sR

@ 200 GeV (stand.) p+p STAR

@ 200 GeV (EMCICs) p+p STAR

@ 21.7 GeV h+p NA22 @ 17.3 GeV (prelim) p+p NA49* = 4.2 〉 _{ππ}y〈 = 3.2 〉 _{ππ}y〈 @ 91 GeV

-+e^+e

OPAL

@ 91 GeV

-+e^+e

L3* @ 91 GeV

-+e^+e

DELPHI

]^2c

[GeV/ Tm 0.2 0.3 0.4 0.5 0.6 0.5

1

1.5

0.5

1

1.5

[fm] lR