| [GeV/c] p | 2/3 >, _T <p 0.2 0.4 0.6 0.8 0.5

1

1.5

/2 [fm] B , R GR

@ 21.7 GeV h+p NA22 @ 27.4 GeV p+p NA27

]c [GeV/ TP 0.2 0.4 0.6 0.8 0.5

1

1.5

[fm] τc

@ 200 GeV (stand.) p+p STAR

@ 1.8 TeV (stand.) p p+ E735