]c [GeV/ TP 0.2 0.4 0.6 0.8 0.5

1

1.5

[fm] invR

@ 200 GeV (stand.) p+p STAR @ 200 GeV (EMCIC) p+p STAR @ 1.8 TeV (stand.) p p+ E735