〉ηd/_{ch}Nd〈

0 5 10 15 20

1

2

[fm] invR

ABCDHW @ 44 GeV p+p

@ 62 GeV p+p

@ 1.8 TeV p p+ E735

@ 200 GeV p+p STAR

standard fit EMCIC fit