[GeV/c] outq

0 0.1 0.2 0.3 0.4 0.5 0.6 0.8 0.9 1 1.1 1.2 )_oC(q

[GeV/c]

sideq

0 0.1 0.2 0.3 0.4 0.5 0.6 0.8 0.9 1 1.1 1.2 )_s

C(q measured CF standard fit fit -qδ fit β-ζ EMCIC fit

[GeV/c]

o,s,lq

0 0.1 0.2 0.3 0.4 0.5 0.6 0.8 0.9 1 1.1 1.2 )_lC(q