/ ndf

2χ 17.2/ 18 LLD 0.060 ± 0.038 / ndf

2χ 17.8/ 18 LLD 0.060 ± 0.065

*θ cos -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

LLD

-3 -2 -1 0 1 2 3 Λ (a)

c <3GeV/ Tp 0.3< <1.2η0< <0 η -1.2<

/ ndf

2χ 21.7 / 18 LLD 0.068 ± 0.096 / ndf

2χ 20.1 / 18 LLD 0.068 ± -0.073

*θ cos -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

LLD

-3 -2 -1 0 1 2 3 Λ (b)

c <3GeV/ Tp 0.3<

/ ndf

2χ 13.4 / 15 LLδ 0.028 ± 0.004 / ndf

2χ 10.4 / 15 LLδ 0.028 ± 0.021

*θ cos -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

LLδ

-3 -2 -1 0 1 2 3 S 0K (c)

c <3GeV/ Tp 0.3<