0 0.2 0.4 0.6 0.8 1 1.2

-310

-210

-110

1

10

210

310 (a) pp 200 GeV

-π _- K p

0 0.2 0.4 0.6 0.8 1 1.2 -3

-2 -110

1

10

210

310 (b) d+Au 200 GeV

-π _- K p

0 0.2 0.4 0.6 0.8 1 1.2 -3

-2

-1 1

10

210

310 (c) Au+Au 62.4 GeV

-π _- K p filled: 0-5% open: 70-80%

[GeV/c] p

]}^{-2} [(GeV/c) dy dp p N^2d π2 1