ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50 100 150 0 2 4 6 8 0 to 5%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50 100 150 0 2 4 6 8 5 to 10%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50 100 150 0 2 4 6 8 10 to 20%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50 100 150 0

5 10 Run 2 central