ηΔ

0 0.2 0.4 0.6 0.8 1 1.2 1.4

(deg) ϕΔ

0 20 40 60 80 100 120 140 160 180

0 0.005

0.01

0.015

0.02

0.025

0.03

CI Signal

0 to 5%

(a)

ηΔ

0 0.2 0.4 0.6 0.8 1 1.2 1.4

(deg) ϕΔ

0 20 40 60 80 100 120 140 160 180

0 0.005

0.01

0.015

0.02

0.025

0.03

CI Signal Data

(b)