MULTx(CI/2-1)

Δϕ (DEG)

MULTx(CI/2-1)

0.0 Λ Δη Λ 0.3

0.3 Λ Δη Λ 0.6

0.6 Λ Δη Λ 0.9

0.9 Λ Δη Λ 1.2

1.2 Λ Δη Λ 1.5 Centrality 0.0Ψ to 5.0Ψ 5.0Ψ to 10.Ψ 60.Ψ to 70.Ψ 70.Ψ to 80.Ψ