ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50

100 150

0.99 1 1.01

0 to 5%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50

100 150

0.99 1 1.01

5 to 10%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50

100 150

0.98 1 1.02

10 to 20%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50

100 150

0.98 1 1.02

1.04

20 to 30%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50

100 150

1 1.05

30 to 40%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50

100 150

0.95 1 1.05

40 to 50%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50

100 150

0.95 1 1.05

50 to 60%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50

100 150

0.95 1 1.05 1.1 60 to 70%

ηΔ

0 0.5 1 1.5

(deg) ϕΔ

0 50

100 150

0.95 1 1.05 1.1 1.15

70 to 80%