Centrality

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 width (deg.) ϕΔ CI Signal RMS (Gaussian)

24 26 28 30 32 34 36 38

Run 4, 200 GeV < 4.0 t 0.8 < P

< 2.0 t 130 GeV, 0.15 < P

Run2 central trigger < 2.0 t 200 GeV, 0.8 < P