Centrality

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

CI Signals X Multiplicity

0

2

4

6

8

< 4.0 t Peak, 200 GeV, 0.8 < P

< 2.0 t Peak, Run2 central trigger, 200 GeV, 0.8 < P

< 2.0 t Peak, 130 GeV, 0.15 < P

Integral for same

Integral for same

Integral for same