GRSV-std g=g Δ GRSV g=0 Δ GRSV

g=-g Δ GRSV GS-C

(GeV/c) Tp 5 10 15 20 25 30

-0.05

0

0.05

0.1

0.15 GRSV-std Δ Δ Δ LLA STAR Data

9.4% scale uncertainty from ± polarization not shown

jet+X → pp